\begin{tabular}{l*{6}{c}}
\toprule
                    &\multicolumn{1}{c}{(1)}&\multicolumn{1}{c}{(2)}&\multicolumn{1}{c}{(3)}&\multicolumn{1}{c}{(4)}&\multicolumn{1}{c}{(5)}&\multicolumn{1}{c}{(6)}\\
                    &\multicolumn{1}{c}{Macro Wage}&\multicolumn{1}{c}{Base}&\multicolumn{1}{c}{Controls}&\multicolumn{1}{c}{Controls, FEs}&\multicolumn{1}{c}{New Hire}&\multicolumn{1}{c}{L(User Cost)}\\
\midrule
HP UR               &      -0.508&      -0.977&      -1.185&      -1.329&      -0.699&      -5.818\\
                    &     (0.471)&     (1.530)&     (1.507)&     (1.623)&     (1.822)&     (2.079)\\
\midrule
Observations        &          34&          25&          25&          25&          25&          27\\
\bottomrule
\multicolumn{7}{l}{\footnotesize Standard errors in parentheses}\\
\multicolumn{7}{l}{\footnotesize Coefficient on HP UR multiplied by 100.}\\
\end{tabular}
